                                                                          PadBidirHE_2.0u

rev. 0

File:F:\Users\Bondar\chip2000\DEL16\DEL16

Module:PadBidirHE Page:Page0

Author:D.Gunawan, J.Luo

Info:Bidirectional Pad

Modified:Feb 1, 2000  11:39:32

Created:May 5, 1993  21:36:43

Tel: (818)792-3000

180 North Vinedo Avenue, Pasadena, CA 91107

Fax: (818)792-0300

1 1

2

2

3 3

4

4

5 5

              A

              A B

                                        B C

                                                                   C D

                                                                                              D E

E F

F G

G

Size: 5x7

                                      PadBidirHE below.

                                      no information for exporting to Spice.

                                      It can be used for TPR, however it contains

                                             PadBidirHE_1.2u

                                      For MOSIS 1.2, 0.8, or 0.5 micron technologies -

                                             PadBidirHE_2.0u

                                      For MOSIS 2.0 micron technology -

                                      to Spice, instance the appropriate

                                      In order to specify a technology for exporting

                                      implementation of the Bidirectional Pad.

                                      This module is the technology independent

                                                                              Pad
                                            DataIn
                                           DataInB

                                       DataInUnBuf
                                             DataOut
                                               OE

                                                                                                       DataIn
                                                                                                      DataInB

                                                                                                  DataInUnBuf
                                                                                                           DataOut
                                                                                                          OE Pad

PadBidirHE_SCMOS

                             Bidirectional Pad

Page:Page0

Module:PadBidirHE