CMS CERN test beam Special test RUN 1 Anode THR Table 1 Jul 14, 98

0 100 200 300 400 500 600 700 800

100 110 120 130 140 150 160 170 180 190 200 Pl 5 Ch 1 TDC, nsec

Events

0 100 200 300 400 500 600 700 800 900

100 110 120 130 140 150 160 170 180 190 200 Pl 5 Ch 1 TDC, nsec

Events