CMS CERN test beam. Generator DAC(1)=2000. Anode THR Table 1. July 98

140 150 160 170 180 190 200

0 10 20 30 40 50 60 70 80 90 Ch

Mean, nsec

140 150 160 170 180 190 200

0 10 20 30 40 50 60 70 80 90 Ch

Mean, nsec