CMS CERN test beam. Generator DAC. Anode THR Table 1. July 98

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

CMS CERN test beam. Generator DAC. Anode THR Table 1. July 98

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

CMS CERN test beam. Generator DAC. Anode THR Table 1. July 98

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

CMS CERN test beam. Generator DAC. Anode THR Table 1. July 98

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

CMS CERN test beam. Generator DAC. Anode THR Table 1. July 98

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

CMS CERN test beam. Generator DAC. Anode THR Table 1. July 98

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

CMS CERN test beam. Generator DAC. Anode THR Table 1. July 98

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

CMS CERN test beam. Generator DAC. Anode THR Table 1. July 98

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

CMS CERN test beam. Generator DAC. Anode THR Table 1. July 98

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

CMS CERN test beam. Generator DAC. Anode THR Table 1. July 98

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

CMS CERN test beam. Generator DAC. Anode THR Table 1. July 98

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

CMS CERN test beam. Generator DAC. Anode THR Table 1. July 98

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec

140 160 180 200

0 10 DAC

Mean, nsec