CMS CERN H2 beam. RUN cscdata-0030. HV=3.8 kV. Theta 0. Anode THR 150. Jun 98

40 45 50 55 60 65 70

30 40 50 60 70 80 Center of slice, nsec

Mean, nsec

40 45 50 55 60 65 70

30 40 50 60 70 80 Center of slice, nsec

Mean, nsec

40 45 50 55 60 65 70

30 40 50 60 70 80 Center of slice, nsec

Mean, nsec

40 45 50 55 60 65 70

30 40 50 60 70 80 Center of slice, nsec

Mean, nsec

40 45 50 55 60 65 70

30 40 50 60 70 80 Center of slice, nsec

Mean, nsec