CMS H2 beam at CERN P2 Theta scan RUNs cscdata-30 thru 40 Jun 98

70 75 80 85 90 95 100

0 20 40 Degrees

Eff. %

70 75 80 85 90 95 100

0 20 40 Degrees

Eff. %

70 75 80 85 90 95 100

0 20 40 Degrees

Eff. %

2 3 4 5 6 7 8 9 10

0 20 40 Degrees

Sigma1, nsec

2 3 4 5 6 7 8 9 10

0 20 40 Degrees

Sigma2, nsec

2 3 4 5 6 7 8 9 10

0 20 40 Degrees

RMS, nsec

CMS H2 beam at CERN P2 Theta scan RUNs cscdata-30 thru 40 Jun 98

20 25 30 35 40 45 50 55 60

0 10 20 30 40 50 Degrees

Gauss center, nsec

4 5 6 7 8 9 10 11 12 13 14

0 10 20 30 40 50 Degrees

Sigma1, nsec

4 5 6 7 8 9 10 11 12 13 14

0 10 20 30 40 50 Degrees

Sigma2, nsec

4 5 6 7 8 9 10 11 12 13 14

0 10 20 30 40 50 Degrees

Sigma, nsec

CMS H2 beam at CERN P2 Theta scan RUNs cscdata-30 thru 40 Jun 98

0

200

400

600

800

1000

1200

1400

1600

1800

2000

-5 0 5 10 15 20 25 30 35 40 45 50 Degrees

Cathode charge, ADC counts