GIF rate from wire group 23 P2P2 Runs 486-489. EMU CMS test beam. CERN Sep 99

10^{-1}

1

10

10^2

1 10 10^2 10^3 GIF K

Rate, kHz

10^{-1}

1

10

10^2

1 10 10^2 10^3 GIF K

Rate, kHz

10^{-1}

1

10

10^2

1 10 10^2 10^3 GIF K

Rate, kHz

10^{-1}

1

10

10^2

1 10 10^2 10^3 GIF K

Rate, kHz

10^{-1}

1

10

10^2

1 10 10^2 10^3 GIF K

Rate, kHz

10^{-1}

1

10

10^2

1 10 10^2 10^3 GIF K

Rate, kHz