CMS CERN test beam RUN 719 GIF OFF HV=3.6 kV Sep 99

0 500 1000

1500

15 20 25 30 Wire group events

0 500 1000

1500

2000

15 20 25 30 Wire group events

0 500 1000

1500

2000

15 20 25 30 Wire group events

0 500 1000

1500

15 20 25 30 Wire group events

0

500

1000

15 20 25 30 Wire group events

0 500 1000

1500

15 20 25 30 Wire group events