FNAL stand. RUN h_r055_4100.dat March 99

2 3 4 5 6 7 8

56 57 58 59 60 Channel

Resolution (RMS), nsec

60 65 70 75 80 85 90 95 100

56 57 58 59 60 Ch

Efficiency, %