AFEB Prod. Test. Mnt. Boards. Runs 21-1604. CMU-FNAL

Ascending run number

0 20 40 60 80 100 120 ns

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 Rel. res. time(50 fC) vs run, sl. 1

ns -1 -0.8-0.6-0.4-0.2 0 0.2 0.4 0.6 0.8 1

Runs

0

10

20

30

40

50 Nent = 126 Mean = 0.05944 RMS = 0.04215 Under = 0 Over = 0 Integ = 126

Rel. res. time, sl. 1 Nent = 126

Ascending run number

0 20 40 60 80 100 120 ns

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 Rel. res. time(100 fC) vs run, sl. 1

ns -1 -0.8-0.6-0.4-0.2 0 0.2 0.4 0.6 0.8 1

Runs

0 10 20 30 40 50 60 70 80 90 Nent = 126 Mean = 0.0469 RMS = 0.0247 Under = 0 Over = 0 Integ = 126

Rel. res. time, sl. 1 Nent = 126

AFEB Prod. Test. Mnt. Boards. Runs 21-1604. CMU-FNAL

Ascending run number

0 20 40 60 80 100 120 ns

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 Rel. res. time(50 fC) vs run, sl. 2

ns -1 -0.8-0.6-0.4-0.2 0 0.2 0.4 0.6 0.8 1

Runs

0 10 20 30 40 50 60 70 80 90 Nent = 126 Mean = -0.05571 RMS = 0.02029 Under = 0 Over = 0 Integ = 126

Rel. res. time, sl. 2_{Nent = 126}

Ascending run number

0 20 40 60 80 100 120 ns

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 Rel. res. time(100 fC) vs run, sl. 2

ns -1 -0.8-0.6-0.4-0.2 0 0.2 0.4 0.6 0.8 1

Runs

0 20 40 60 80 100 120 Nent = 126 Mean = -0.02349 RMS = 0.01018 Under = 0 Over = 0 Integ = 126

Rel. res. time, sl. 2_{Nent = 126}

AFEB Prod. Test. Mnt. Boards. Runs 21-1604. CMU-FNAL

Ascending run number

0 20 40 60 80 100 120 ns

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 Rel. res. time(50 fC) vs run, sl. 3

ns -1 -0.8-0.6-0.4-0.2 0 0.2 0.4 0.6 0.8 1

Runs

0 10 20 30 40 50 60 70 80 Nent = 126 Mean = 0.004365 RMS = 0.02412 Under = 0 Over = 0 Integ = 126

Rel. res. time, sl. 3_{Nent = 126}

Ascending run number

0 20 40 60 80 100 120 ns

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 Rel. res. time(100 fC) vs run, sl. 3

ns -1 -0.8-0.6-0.4-0.2 0 0.2 0.4 0.6 0.8 1

Runs

0 10 20 30 40 50 60 70

Nent = 126 Mean = -0.007063 RMS = 0.007875 Under = 0 Over = 0 Integ = 126

Rel. res. time, sl. 3_{Nent = 126}

AFEB Prod. Test. Mnt. Boards. Runs 21-1604. CMU-FNAL

Ascending run number

0 20 40 60 80 100 120 ns

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 Rel. res. time(50 fC) vs run, sl. 4

ns -1 -0.8-0.6-0.4-0.2 0 0.2 0.4 0.6 0.8 1

Runs

0 10 20 30 40 50 60 70 80 90

Nent = 126 Mean = -0.08159 RMS = 0.02098 Under = 0 Over = 0 Integ = 126

Rel. res. time, sl. 4_{Nent = 126}

Ascending run number

0 20 40 60 80 100 120 ns

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 Rel. res. time(100 fC) vs run, sl. 4

ns -1 -0.8-0.6-0.4-0.2 0 0.2 0.4 0.6 0.8 1

Runs

0

20

40

60

80

100

Nent = 126 Mean = -0.0154 RMS = 0.01478 Under = 0 Over = 0 Integ = 126

Rel. res. time, sl. 4 Nent = 126

AFEB Prod. Test. Mnt. Boards. Runs 21-1604. CMU-FNAL

Ascending run number

0 20 40 60 80 100 120 ns

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 Rel. res. time(50 fC) vs run, sl. 5

ns -1 -0.8-0.6-0.4-0.2 0 0.2 0.4 0.6 0.8 1

Runs

0 10 20 30 40 50 60 70 Nent = 126 Mean = -0.007778 RMS = 0.01713 Under = 0 Over = 0 Integ = 126

Rel. res. time, sl. 5_{Nent = 126}

Ascending run number

0 20 40 60 80 100 120 ns

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 Rel. res. time(100 fC) vs run, sl. 5

ns -1 -0.8-0.6-0.4-0.2 0 0.2 0.4 0.6 0.8 1

Runs

0 10 20 30 40 50 60 70 80 90 Nent = 126 Mean = -0.01143 RMS = 0.01052 Under = 0 Over = 0 Integ = 126

Rel. res. time, sl. 5_{Nent = 126}

AFEB Prod. Test. Mnt. Boards. Runs 21-1604. CMU-FNAL

Ascending run number

0 20 40 60 80 100 120 ns

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 Rel. res. time(50 fC) vs run, sl. 6

ns -1 -0.8-0.6-0.4-0.2 0 0.2 0.4 0.6 0.8 1

Runs

0 10 20 30 40 50 60 70

Nent = 126 Mean = -0.008413 RMS = 0.01953 Under = 0 Over = 0 Integ = 126

Rel. res. time, sl. 6_{Nent = 126}

Ascending run number

0 20 40 60 80 100 120 ns

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 Rel. res. time(100 fC) vs run, sl. 6

ns -1 -0.8-0.6-0.4-0.2 0 0.2 0.4 0.6 0.8 1

Runs

0 10 20 30 40 50 60 70

Nent = 126 Mean = -0.006349 RMS = 0.007929 Under = 0 Over = 0 Integ = 126

Rel. res. time, sl. 6_{Nent = 126}

AFEB Prod. Test. Mnt. Boards. Runs 21-1604. CMU-FNAL

Ascending run number

0 20 40 60 80 100 120 ns

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 Rel. res. time(50 fC) vs run, sl. 7

ns -1 -0.8-0.6-0.4-0.2 0 0.2 0.4 0.6 0.8 1

Runs

0 10 20 30 40 50 60 70 Nent = 126 Mean = -0.03698 RMS = 0.01524 Under = 0 Over = 0 Integ = 126

Rel. res. time, sl. 7_{Nent = 126}

Ascending run number

0 20 40 60 80 100 120 ns

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 Rel. res. time(100 fC) vs run, sl. 7

ns -1 -0.8-0.6-0.4-0.2 0 0.2 0.4 0.6 0.8 1

Runs

0 10 20 30 40 50 60 70 80

Nent = 126 Mean = -0.00246 RMS = 0.006865 Under = 0 Over = 0 Integ = 126

Rel. res. time, sl. 7_{Nent = 126}

AFEB Prod. Test. Mnt. Boards. Runs 21-1604. CMU-FNAL

Ascending run number

0 20 40 60 80 100 120 ns

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 Rel. res. time(50 fC) vs run, sl. 8

ns -1 -0.8-0.6-0.4-0.2 0 0.2 0.4 0.6 0.8 1

Runs

0 10 20 30 40 50 60 70

Nent = 126 Mean = -0.0727 RMS = 0.02318 Under = 0 Over = 0 Integ = 126

Rel. res. time, sl. 8 Nent = 126

Ascending run number

0 20 40 60 80 100 120 ns

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 Rel. res. time(100 fC) vs run, sl. 8

ns -1 -0.8-0.6-0.4-0.2 0 0.2 0.4 0.6 0.8 1

Runs

0 20 40 60 80 100 120 Nent = 126 Mean = -0.02198 RMS = 0.009345 Under = 0 Over = 0 Integ = 126

Rel. res. time, sl. 8_{Nent = 126}

AFEB Prod. Test. Mnt. Boards. Runs 21-1604. CMU-FNAL

Ascending run number

0 20 40 60 80 100 120 ns

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 Rel. res. time(50 fC) vs run, sl. 9

ns -1 -0.8-0.6-0.4-0.2 0 0.2 0.4 0.6 0.8 1

Runs

0

10

20

30

40

50

Nent = 126 Mean = -0.08421 RMS = 0.03734 Under = 0 Over = 0 Integ = 126

Rel. res. time, sl. 9_{Nent = 126}

Ascending run number

0 20 40 60 80 100 120 ns

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 Rel. res. time(100 fC) vs run, sl. 9

ns -1 -0.8-0.6-0.4-0.2 0 0.2 0.4 0.6 0.8 1

Runs

0

20

40

60

80

100

Nent = 126 Mean = 0.0009524 RMS = 0.008585 Under = 0 Over = 0 Integ = 126

Rel. res. time, sl. 9_{Nent = 126}

AFEB Prod. Test. Mnt. Boards. Runs 21-1604. CMU-FNAL

Ascending run number

0 20 40 60 80 100 120 ns

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 Rel. res. time(50 fC) vs run, sl. 10

ns -1 -0.8-0.6-0.4-0.2 0 0.2 0.4 0.6 0.8 1

Runs

0 5 10 15 20 25 30 35 40 45

Nent = 126 Mean = -0.1 RMS = 0.03441 Under = 0 Over = 0 Integ = 126

Rel. res. time, sl. 10 Nent = 126

Ascending run number

0 20 40 60 80 100 120 ns

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 Rel. res. time(100 fC) vs run, sl. 10

ns -1 -0.8-0.6-0.4-0.2 0 0.2 0.4 0.6 0.8 1

Runs

0

20

40

60

80

100 Nent = 126 Mean = -0.03587 RMS = 0.01093 Under = 0 Over = 0 Integ = 126

Rel. res. time, sl. 10_{Nent = 126}