CMS EMU CSC DEL16 Test Status. Trays 1-149. CMU-FNAL

0 50 100 150 200 250 300 0

5000

10000

15000

20000

25000

Number of tested DEL16 chips vs time

Days 0 0

25000 Tested Certified Plan

Start - 11/01/2001 (plan) End - 07/01/2002 (plan) Last Test - 07/05/2002

23515 tested 20116 certified 86% yield