DEL16M chips in mass production test (FNAL ASIC stand) 2001

0 1 2 3 4 5 6

0 20 40 60 80 100 120 140 160 Chip number ns

0 1 2 3 4 5 6

0 20 40 60 80 100 120 140 160 Chip number ns