DEL16M chips in mass production test (FNAL ASIC stand) 2001

0

200

400

600

800

1000

120 122 124 126 128 130 Time, ns

Number of pulses

0

200

400

600

800

1000

120 122 124 126 128 130 Time, ns

Number of pulses

0

200

400

600

800

1000

120 122 124 126 128 130 Time, ns

Number of pulses

0

200

400

600

800

1000

120 122 124 126 128 130 Time, ns

Number of pulses

DEL16M chips in mass production test (FNAL ASIC stand) 2001

0

200

400

600

800

1000

120 122 124 126 128 130 Time, ns

Number of pulses

0

200

400

600

800

1000

120 122 124 126 128 130 Time, ns

Number of pulses

0

200

400

600

800

1000

120 122 124 126 128 130 Time, ns

Number of pulses

0

200

400

600

800

1000

120 122 124 126 128 130 Time, ns

Number of pulses

DEL16M chips in mass production test (FNAL ASIC stand) 2001

0

200

400

600

800

1000

120 122 124 126 128 130 Time, ns

Number of pulses

0

200

400

600

800

1000

120 122 124 126 128 130 Time, ns

Number of pulses

0

200

400

600

800

1000

120 122 124 126 128 130 Time, ns

Number of pulses

0

200

400

600

800

1000

120 122 124 126 128 130 Time, ns

Number of pulses

DEL16M chips in mass production test (FNAL ASIC stand) 2001

0

200

400

600

800

1000

120 122 124 126 128 130 Time, ns

Number of pulses

0

200

400

600

800

1000

120 122 124 126 128 130 Time, ns

Number of pulses

0

200

400

600

800

1000

120 122 124 126 128 130 Time, ns

Number of pulses

0

200

400

600

800

1000

120 122 124 126 128 130 Time, ns

Number of pulses