AFEB parameters vs time after p, n irradiation and heating. Sep 2000 - Feb 2001

-0.4

-0.2 0 0.2 0.4

0 50 100 150 200 Days

Noise - Noise(0) fC

-0.4

-0.2 0 0.2 0.4

0 50 100 150 200 Days

Noise - Noise(0) fC

-0.4

-0.2 0 0.2 0.4

0 50 100 150 200 Days

Noise - Noise(0) fC

-0.4

-0.2 0 0.2 0.4

0 50 100 150 200 Days

Noise - Noise(0) fC

-0.4

-0.2 0 0.2 0.4

0 50 100 150 200 Days

Noise - Noise(0) fC

-0.4

-0.2 0 0.2 0.4

0 50 100 150 200 Days

Noise - Noise(0) fC