CMP16F chips in 63.3 MeV proton beam at UC Davis June 2000

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

0 20 40 60 krad

RMS/RMS(0)

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

0 20 40 60 krad

RMS/RMS(0)

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

0 20 40 60 krad

RMS/RMS(0)

0 0.5 1 1.5 2 2.5 3

0 50 100 150 200 fC

RMS(0) nsec