CMP16F chips in 63.3 MeV proton beam at UC Davis June 2000

0.8 0.85 0.9 0.95 1 1.05 1.1

0 20 40 60 krad

Qthr/Qthr(0)

0.5 0.6 0.7 0.8 0.9 1 1.1 1.2 1.3 1.4 1.5

0 20 40 60 krad

Sigma/Sigma(0)

0.9 0.95 1 1.05 1.1 1.15 1.2

0 20 40 60 krad

Gain/Gain(0)

0.5 0.6 0.7 0.8 0.9 1 1.1 1.2 1.3 1.4 1.5

0 20 40 60 krad

Offset/Offset(0)