CMP16 Chip 1 Fitted Gain and Discr. Level, Apr 99

1 2 3 4 5 6 7 8 9 10

0 2 4 6 8 10 12 14 16 ch

Gain (mV/fC)

400 450 500 550 600 650 700 750 800

0 2 4 6 8 10 12 14 16 ch

Discr. lev. mv