CMS CERN test beam RUN 719 GIF OFF HV=3.6 kV Sep 99

0 50 100 150 200 250 300 350 400 450

0 20 40 60 80 100 120 140 nsec events

0 20 40 60 80 100 120 140 160

0 20 40 60 80 100 120 140 nsec events