n*1000 + t(ns), n=1,3 - side strips, n=2 - central strip

1000 1500 2000 2500 3000

Normalized charge

0

0.2

0.4

0.6

0.8

1 Q 0.006768 ± 0.9903 Ts 0.002382 ± 65.08 T0 0.1877 ± 34.11 Ct 0.006204 ± 0.0964

± ± ± ±

Fit Data

n*1000 + t(ns), n=1,3 - side strips, n=2 - central strip

1000 1500 2000 2500 3000

Data-Fit

-0.04

-0.02

0

0.02

0.04

n*1000 + t(ns), n=1,3 - side strips, n=2 - central strip

1000 1500 2000 2500 3000

Normalized charge

0

0.2

0.4

0.6

0.8

1 Q 0.005659 ± 0.991 Ts 0.006616 ± 71.4 T0 0.1985 ± 34.09 Ct 0.005966 ± 0.09726

± ± ± ±

Fit Data

n*1000 + t(ns), n=1,3 - side strips, n=2 - central strip

1000 1500 2000 2500 3000

Data-Fit

-0.04

-0.02

0

0.02

0.04

n*1000 + t(ns), n=1,3 - side strips, n=2 - central strip

1000 1500 2000 2500 3000

Normalized charge

0

0.2

0.4

0.6

0.8

1 Q 0.00677 ± 0.9876 Ts 0.02029 ± 76.52 T0 0.2203 ± 34.46 Ct 0.004778 ± 0.09796

± ± ± ±

Fit Data

n*1000 + t(ns), n=1,3 - side strips, n=2 - central strip

1000 1500 2000 2500 3000

Data-Fit

-0.04

-0.02

0

0.02

0.04

n*1000 + t(ns), n=1,3 - side strips, n=2 - central strip

1000 1500 2000 2500 3000

Normalized charge

0

0.2

0.4

0.6

0.8

1 Q 0.0002572 ± 0.9769 Ts 0.0279 ± 79.09 T0 0.0007299 ± 35.78 Ct 0.0002512 ± 0.09789

± ± ± ±

Fit Data

n*1000 + t(ns), n=1,3 - side strips, n=2 - central strip

1000 1500 2000 2500 3000

Data-Fit

-0.04

-0.02

0

0.02

0.04

n*1000 + t(ns), n=1,3 - side strips, n=2 - central strip

1000 1500 2000 2500 3000

Normalized charge

0

0.2

0.4

0.6

0.8

1 Q 0.0068 ± 0.9827 Ts 0.001583 ± 87.01 T0 0.2281 ± 35.24 Ct 0.006248 ± 0.09768

± ± ± ±

Fit Data

n*1000 + t(ns), n=1,3 - side strips, n=2 - central strip

1000 1500 2000 2500 3000

Data-Fit

-0.04

-0.02

0

0.02

0.04

n*1000 + t(ns), n=1,3 - side strips, n=2 - central strip

1000 1500 2000 2500 3000

Normalized charge

0

0.2

0.4

0.6

0.8

1 Q 0.006586 ± 0.9791 Ts 0.003703 ± 91.19 T0 0.1503 ± 36.02 Ct 0.006282 ± 0.09662

± ± ± ±

Fit Data

n*1000 + t(ns), n=1,3 - side strips, n=2 - central strip

1000 1500 2000 2500 3000

Data-Fit

-0.04

-0.02

0

0.02

0.04

n*1000 + t(ns), n=1,3 - side strips, n=2 - central strip

1000 1500 2000 2500 3000

Normalized charge

0

0.2

0.4

0.6

0.8

1 Q 0.007012 ± 0.9865 Ts 0.2472 ± 100 T0 0.07797 ± 35.33 Ct 0.0062 ± 0.09543

± ± ± ±

Fit Data

n*1000 + t(ns), n=1,3 - side strips, n=2 - central strip

1000 1500 2000 2500 3000

Data-Fit

-0.04

-0.02

0

0.02

0.04

n*1000 + t(ns), n=1,3 - side strips, n=2 - central strip

1000 1500 2000 2500 3000

Normalized charge

0

0.2

0.4

0.6

0.8

1 Q 0.009866 ± 0.9899 Ts 3.484±

108.7 T0 1.26±

34.45 Ct 0.006183 ± 0.09622

±

±

Fit Data

n*1000 + t(ns), n=1,3 - side strips, n=2 - central strip

1000 1500 2000 2500 3000

Data-Fit

-0.04

-0.02

0

0.02

0.04