Chip CMP16F Cdet=180 pF Gain and Offset Fermilab Stand May 2000

0 10 20 30 40 50 60 70

0 2 4 6 8 10 12 14 16 18 20 mv/fC

0

10 20 30 40

50

-150 -100 -50 0 50 100 150 mv