Chip CMP16F JTAG=1400 mV Cdet=180 pF Fermilab Stand May 2000

0 5 10 15 20 25 30 35 40 45

0 10 20 30 40 50 60 70 80 90 100 fC

0 20 40 60 80 100

0 0.5 1 1.5 2 2.5 3 fC