CMP16F board 24 on CSC. Qthr and noise. Run 10507 Fermilab July 2000

0

20

40

60

80

100

0 100 200 300 Ch

Qthr, fC

0 2 4 6 8 10 12 14 16

0 20 40 60 80 100 fC

Number of entries

0 1 2 3 4 5 6 7 8 9 10

0 100 200 300 Ch

Noise (RMS), fC

0 5 10 15 20 25 30

0 1 2 3 4 5 fC

Number of entries