CMP16F boards on CSC. Delay scan. Runs 10463 - 10478 Fermilab July 2000

0 250 500 750 1000

0 10 Wire group 350 0 250 500 750 1000

0 10 Wire group 350 0 250 500 750 1000

0 10 Wire group 350 0 250 500 750 1000

0 10 Wire group 350

0 250 500 750 1000

0 10 Wire group 350 0 200 400 600 800

0 10 Wire group 350 0 200 400 600 800

0 10 Wire group 350 0 200 400 600

0 10 Wire group 350

0 200 400 600

0 10 Wire group 350 0 200 400 600 800

0 10 Wire group 350 0 250 500 750 1000

0 10 Wire group 350 0 250 500 750 1000

0 10 Wire group 350

0 250 500 750 1000

0 10 Wire group 350 0 250 500 750 1000

0 10 Wire group 350 0 250 500 750 1000

0 10 Wire group 350 0 250 500 750 1000

0 10 Wire group 350