CSC ME234/2-1. TDC hits. FNAL July 2000

0

100

200

300

0 25 50 Wire group

HV50(40 fC - 20 fC), V

0

100

200

300

0 25 50 Wire group

HV50(40 fC - 20 fC), V

0

100

200

300

0 25 50 Wire group

HV50(40 fC - 20 fC), V

0

100

200

300

0 25 50 Wire group

HV50(40 fC - 20 fC), V

0

100

200

300

0 25 50 Wire group

HV50(40 fC - 20 fC), V

0

100

200

300

0 25 50 Wire group

HV50(40 fC - 20 fC), V

0

10

20

30

40

50

0 200 V

Number of wire groups, all layers