CSC ME234/2-1 Run10268 HV=3600 Qth=20 fC July 2000 FNAL

0 50 100 150

0 50 100 150 ns

Hits

0 50 100 150

0 50 100 150 ns

Hits

0 50 100 150

0 50 100 150 ns

Hits

0 50 100 150

0 50 100 150 ns

Hits

0 50 100 150

0 50 100 150 ns

Hits

0 50 100 150

0 50 100 150 ns

Hits

0

200

400

600

800

1000

0 50 100 150 ns

Hits