ALCT384 U(20) from test 13 and U(20) from stand. CMU-UF Dec. 2002

AFEB N

0 5 10 15 20 25 mV

-50 -40 -30 -20 -10 0 10 20 30 40 50 U(20) vs AFEB N

U(20) FAST corr. - U(20) STAND U(20) FAST - U(20) STAND

AFEB N

0 5 10 15 20 25 fC

-5 -4 -3 -2 -1 0 1 2 3 4 5 Qthr(20) FAST corr. - Qthr(20) STAND vs AFEB N

fC -5 -4 -3 -2 -1 0 1 2 3 4 5

AFEB

0 1 2 3 4 5 6 Nent = 24 Mean = -1.716 RMS = 0.543 Under = 0 Over = 0 Integ = 24

Qthr(20) FAST corr. - Qthr(20) STAND