CMP16F Time resolution at Qthr=17 fC. FNAL stand 2000

0 20 40 60 80 100 120 140

0 1 2 3 4 ns

Channels

0 50 100 150 200 250 300 350

0 1 2 3 4 ns

Channels

0 50 100 150 200 250 300 350 400

0 1 2 3 4 ns

Channels

0 20 40 60 80 100 120 140 160

0 1 2 3 4 ns

Channels