ME234/2-12. Runs 10835-10865. HV=0 kV. Min Qthr study. FNAL Nov. 2000.

1

10

10^2

10^3

10^4

10^5

10^6

10^7

0 5 10 15 20 25 30 fC

Noise average rate/channel, Hz