Drift time simulation with delay smearing. Sigma delay=15 nsec

0 100 200 300 400

0 50 100 150 200 nsec events

0

200

400

0 50 100 150 200 nsec events

0 100 200 300 400

0 50 100 150 200 nsec events

0 100 200 300 400

0 50 100 150 200 nsec events

0 100 200 300 400

0 50 100 150 200 nsec events

0

100

200

300

0 50 100 150 200 nsec events