CMP16E chip 20 in 63.3 MeV proton beam at UC Davis April 2000

0.8 0.9 1 1.1 1.2 1.3 1.4

200 400 600 Total ionizing dose, krad

I(t)/I(0)

0.9 0.92

0.94

0.96

0.98 1 1.02

1.04

200 400 600 Total ionizing dose, krad

Vd(t)/Vd(0)

0.9 0.92

0.94

0.96

0.98 1 1.02

1.04

200 400 600 Total ionizing dose, krad

Va(t)/Va(0)

0.9 0.92

0.94

0.96

0.98 1 1.02

1.04

200 400 600 Total ionizing dose, krad

Vc(t)/Vc(0)