CMP16F Chip vs Cdet. Fermilab Stand. May 2000

-5 -4 -3 -2 -1 0 1 2 3 4 5

0 50 100 150 200 Cdet, pF fC

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2

0 50 100 150 200 Cdet, pF fC

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2

0 50 100 150 200 Cdet, pF mV/fC

-10 -8 -6 -4 -2 0 2 4 6 8 10

0 50 100 150 200 Cdet, pF mV