Chip CMP16E Cdet=180 pF Ud=1400 mV Fermilab Feb 2000

0 20 40 60 80

110 115 120 125 130 135 140 145 150 155 160 nsec

0 10 20 30

0 1 2 3 4 5 6 7 8 9 10 nsec

0 25 50 75 100

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 nsec