P2P2 AD96D Calib (inj brds-runs 387-398, cath strp-runs 400-405) CERN Sep 99

0 20 40 60 80 100

0 20 40 60 ch

Threshold, fC

0 20 40 60 80 100

0 20 40 60 ch

Threshold, fC

0 20 40 60 80 100

0 20 40 60 ch

Threshold, fC

0 20 40 60 80 100

0 20 40 60 ch

Threshold, fC

0 20 40 60 80 100

0 20 40 60 ch

Threshold, fC

0 20 40 60 80 100

0 20 40 60 ch

Threshold, fC