CMS CERN test beam RUN 449 GIF OFF HV=3.6 kV Theta 20 Sep 99

0 200 400 600 800 1000

1200

1400

1600

0 10 20 30 40 50 60 70 80 90 Number of hits/event

Events

0 1000

2000

3000

4000

5000

0 10 20 30 40 50 60 70 80 90 Number of hits/event

Events