CMS CERN test beam RUN 449 GIF OFF HV=3.6 kV Theta 20 Sep 99

700 750 800 850 900 950

20 25 30 Ch number

TDC

700 750 800 850 900 950

20 25 30 Ch number

TDC

700 750 800 850 900 950

20 25 30 Ch number

TDC

700 750 800 850 900 950

20 25 30 Ch number

TDC

700 750 800 850 900 950

20 25 30 Ch number

TDC

700 750 800 850 900 950

20 25 30 Ch number

TDC