D16G delay chips in mass production test(FNAL ASIC stand), trays 4_10, Sep. 2001

1 1.25 1.5 1.75 2 2.25 2.5 2.75 3 3.25 3.5

0 250 500 750 1000 Chip number

Average Slope, ns

0 25 50 75 100 125 150 175 200 225

1 1.5 2 2.5 3 3.5 ns chips

0 0.05 0.1 0.15 0.2 0.25 0.3

0 250 500 750 1000 Chip number

Max Abs(Max,Min - Aver) Slope, ns

0 20 40 60 80 100 120 140 160 180

0 0.1 0.2 0.3 ns chips