D16G delay chips in mass production test(FNAL ASIC stand), trays 4_10, Sep. 2001

-4 -3 -2 -1 0 1 2 3 4 5 6

0 250 500 750 1000 Chip number

Max. Diff. Slope, ns

0 100 200 300 400 500 600

-4 -2 0 2 4 6 ns chips

-4 -3 -2 -1 0 1 2 3 4 5 6

0 250 500 750 1000 Chip number

Min. Diff. Slope, ns

0 50 100 150 200 250 300 350

-4 -2 0 2 4 6 ns chips