CMS Muon Endcap CSC AFEB Production Test. CMU-FNAL 2001

0 20 40 60 80 100 120 50

55

60

65

70

75

80 Average Propagation Time vs Board at Qin=100 fC

Board in ascending board number order ns ns 50 55 60 65 70 75 80

Boards

0

5

10

15

20

25

30

Average Propagation Time at Qin=100 fC Nent = 124 Mean = 70.1 RMS = 1.258 Under = 0 Over = 0 Integ = 124

0 20 40 60 80 100 120 0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 Max. Abs. Propagation Time Residual vs Board at Qin=100 fC

Board in ascending board number order ns

0

1

2

3

4

5

0

1

2

3

4

5

ns 0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5

Boards

0

5

10

15

20

25

30

35 Max. Abs. Propagation Time Residual at Qin=100 fC

Nent = 124 Mean = 0.534 RMS = 0.1978 Under = 0 Over = 0 Integ = 124