P2P2 GIF ON Runs 486-489 HV=3.6 Qth=20 Ar(40%)+CO2(50%)+CF4(10%) CERN Sep 99

0 10 20 30 40 50 60 70 80 90 100

1 10 10^2 GIF factor K

Rate/channel, kHz

0 10 20 30 40 50 60 70 80 90 100

1 10 10^2 GIF factor K

Rate/channel, kHz

0 10 20 30 40 50 60 70 80 90 100

1 10 10^2 GIF factor K

Rate/channel, kHz

0 10 20 30 40 50 60 70 80 90 100

1 10 10^2 GIF factor K

Rate/channel, kHz

0 10 20 30 40 50 60 70 80 90 100

1 10 10^2 GIF factor K

Rate/channel, kHz

0 10 20 30 40 50 60 70 80 90 100

1 10 10^2 GIF factor K

Rate/channel, kHz