D16G Delay Chips Test. Trays 1-17 after cuts. CMU-FNAL 2001

ns 40 42 44 46 48 50 52 54 56 58 60 62 64

Chips

0

100

200

300

400

500

600

Aver. Delay(15) _{Nent = 2250}

Mean = 53.1 RMS = 3.62 Under = 1 Over = 0 Integ = 2249