CMS EMU CSC AFEB Prod. Test. Runs 1000021_336. CMU-FNAL 2001

0 500 1000 1500 2000 2500 0 5 10 15 20 25 30 35 40 45 50 Average Qthr vs board

Board in ascending run number order fC

0 5 0 5

fC 0 5 10 15 20 25 30 35 40 45 50

Boards

0

50

100

150

200

250

300

350

Average Qthr _{Nent = 2722}

Mean = 28.76 RMS = 3.239 Under = 0 Over = 0 Integ = 2722

0 500 1000 1500 2000 2500 0 1 2 3 4 5 6 7 8 9 10 Max. abs. Qthr residual vs board

Board in ascending run number order fC

0 1 2 3 4 5 6 7 8 9

0 1 2 3 4 5 6 7 8 9

fC 0 1 2 3 4 5 6 7 8 9 10

Boards

0

100

200

300

400

500 Max. abs. Qthr residual _{Nent = 2722}

Mean = 1.929 RMS = 0.5324 Under = 0 Over = 2 Integ = 2720