Anode P2p2 Efficiency Wire group 23 CERN 99 Test Beam

3 3.1 3.2 3.3 3.4 3.5 3.6 3.7 3.8 3.9 4

1 2 3 4 5 6 Layer

HV(eff=95%), kV