ALCT(N120)/AFEB(N1) Test Pulse Max. Ampl. vs DAC, ME234/2 N85,UCLA, Jan.2003

DAC 0 50 100 150 200 250 mV

0 100 200 300 400 500 600 700 800 900 1000

Test pulse max. ampl. vs DAC

17.4 + 4.80*DAC - 0.00113*DAC*DAC 21.7 + 4.94*DAC - 0.00092*DAC*DAC 18.0 + 4.60*DAC

DAC 0 50 100 150 200 250 mV

-500

-400

-300

-200

-100

0 Test pulse max. ampl. (data-fit)

DAC 0 50 100 150 200 250 fC

0

50

100

150

200

250 Test Qin vs DAC at Cint=0.25 pF

DAC 0 50 100 150 200 250 fC

-140

-120

-100 -80 -60 -40 -20 0

Test Qin vs DAC at Cint=0.25 pF, (data-fit)